<template>
	<view>
		<cu-custom bgColor="bg-gradual-blueness" :isBack="true" :isRingt="true">
			<block slot="backText">返回</block>
			<block slot="content">发现问题</block>
		</cu-custom>
		<scroll-view class="dy-scroll" @scrolltolower="scrolltolower" scroll-y :style="'top:'+sTop+'px;height:calc(100vh - '+totalHeight+'px)'">
			<view v-if="list.length>0" >
				<view class="dy-list">
					<view v-for="(item,index) of list" :key="index" :data-id="item.HIDDEN_ID" @click="$noMultipleClicks(goToDetail,item)" class="dy-list-item p20">
						<view class="dy-subtitle-flex" style="flex-wrap: wrap">
							<view style="flex-basis: 100%">
                <text>{{ index + 1 }}</text>
                <text class="number" style="margin-left: 20upx;">{{ item.HIDDENDESCR }}</text>
              </view>
              <view style="flex-basis: 100%;margin-top: 10upx">
                <text>隐患状态：{{ translateHidden(item.HIDDEN_STATUS) }}</text>
              </view>
              <view style="flex-basis: 100%" class="dy-subtitle-flex">
                <text>隐患描述：{{item.HIDDENDESCR}}</text>
              </view>
			  <view style="flex-basis: 100%;margin-top: 10upx;">
				  <text></text>
				  <text>
					  <button class="cu-btn bg-green margin-tb-sm sm" style="float:right" @click="$noMultipleClicks(goToDetail,item)">查看</button>
					  <button style="margin-left: 10px;float:right" v-if="item.INSPECTED_SITEUSER_ID === USER_ID && item.HIDDEN_STATUS === '101'" class="cu-btn bg-blue margin-tb-sm sm"
							  @click="$noMultipleClicks(goToAssignConfirm,item)">指派</button>
					  <button style="margin-left: 10px;float: right" v-if="item.CREATOR === USER_ID && (item.HIDDEN_STATUS === '4' || item.HIDDEN_STATUS === '8') && (!item.FINAL_CHECK || item.FINAL_CHECK === '2')" class="cu-btn bg-blue margin-tb-sm sm"
							  @click="$noMultipleClicks(goToAccept,item)">验收</button>
				  </text>			  </view>
						</view>
					</view>
				</view>
			</view>
			<view v-else-if="dataFlag=='noData'" class="dy-null">
				<view class="dy-null-img">
					<image :src="background[dataFlag].url" mode=""></image>
				</view>
				<view class="dy-null-title">
					{{background[dataFlag].msg}}
				</view>
			</view>
			<view class="cu-tabbar-height"></view>
		</scroll-view>
	</view>
</template>

<script>
	import {
		basePath,corpinfoId,loginSession,formatDate,loginUser
	} from '@/common/tool.js';
	import tkiTree from "@/components/select-tree/select-tree.vue"
	export default {
		components: {
			tkiTree
		},
		data() {
			return {
				dataFlag:'noData',
				sTop:0,
				totalHeight:0,
				list:[],//返回数据
				page:1,//分页参数--页数
				rows:10,//分页参数--每页数据条数
				totalCount:0,//分页参数--初始化页数
				isEnd:false,//防止多次刷新
				totalPage: 0, //分页参数--分页数量
				NameLikes : '',
				noClick:true,
				statusList:[
					{id:'3-7',name:'请选择'},
					{id:'3',name:'待指派'},
					{id:'4',name:'指派中'},
					{id:'5',name:'指派完成'},
					{id:'6',name: '待验收' },
					{id:'7',name: '已验收' }
				],
				hiddenStatusList: [
					{ ID: '', NAME: '请选择' },
					{ ID: '1', NAME: '待整改' },
					{ ID: '2', NAME: '待验收' },
					{ ID: '3', NAME: '已复查' },
					{ ID: '4', NAME: '已验收' },
					{ ID: '5', NAME: '忽略隐患' },
					{ ID: '6', NAME: '重大隐患' },
					{ ID: '7', NAME: '待处理的特殊申请隐患' },
					{ ID: '8', NAME: '已处理的特殊隐患' },
          { ID: '10', NAME: '验收打回' },
          { ID: '11', NAME: '分公司安委会办公室副主任核定' },
          { ID: '12', NAME: '分公司安委会办公室副主任核定' },
          { ID: '13', NAME: '港股分公司安委会办公室副主任核定、重大隐患待整改' },
          { ID: '13', NAME: '重大隐患待验收' },
          { ID: '15', NAME: '重大隐患已归档' },
          { ID: '16', NAME: '确认打回' },
          { ID: '100', NAME: '安全环保检查暂存的隐患' },
          { ID: '100', NAME: '检查已归档，待指派' },
          { ID: '101', NAME: '待指派确认人' },
          { ID: '-1', NAME: '已过期' },
          { ID: '-2', NAME: '待确认' }
				],
				INSPECTION_ID: '',
				sindex: 0,
				STATUS:'3-7',
				USER_ID: loginUser.USER_ID
			}
		},
		onReady() {
			let that=this;
			let CustomBar = this.CustomBar;
			uni.getSystemInfo({ //调用uni-app接口获取屏幕高度
				success(res) { //成功回调函数
					let titleH=uni.createSelectorQuery().select(".top-fixed"); //想要获取高度的元素名（class/id）
					titleH.boundingClientRect(data=>{
						that._data.sTop=data.height  //计算高度：元素高度=窗口高度-元素距离顶部的距离（data.top）
						that.totalHeight = data.height+CustomBar
					}).exec()
				}
			})
		},
		onLoad(event) {//页面第一次加载时触发，从跳转页面返回时不能触发，可以传递参
			this.INSPECTION_ID = event.INSPECTION_ID;
		},
		onShow() {
			//页面显示或从后台跳回小程序时显示此页面时触发，从跳转页面返回时触发，不能传递参数
			var _this = this;
			_this.background = require('@/common/background.json');
			_this.showCount = -1;
			_this.currentPage = 1;
			_this.list = [];
			_this.isEnd = false;
			_this.getData();
			// _this.getDept();
			loginSession();
		},

		filters: {
			formatDate(time) {
				let date = new Date(time)
				return formatDate(date, 'yyyy-MM-dd')
			}
		},
		methods: {
			translateHidden(id) {
				for (var i = 0; i < this.hiddenStatusList.length; i++) {
					if (this.hiddenStatusList[i].ID == id) return this.hiddenStatusList[i].NAME
				}
			},
			//跳转事件
			goToDetail(e) {
				uni.navigateTo({
					url: '/pages/application/safety-environmental-inspection/archive/detail-hidden?HIDDEN_STATUS=0&INSPECTION_ID='+e.INSPECTION_ID + '&HIDDEN_ID=' + e.HIDDEN_ID
				});
			},
			goToAssignConfirm(e) {
				uni.navigateTo({
					url: '/pages/application/safety-environmental-inspection/archive/detail-hidden?HIDDEN_STATUS=-2&INSPECTION_ID='+e.INSPECTION_ID + '&HIDDEN_ID=' + e.HIDDEN_ID
				});
			},
			goToAccept(e) {
				uni.navigateTo({
					url: '/pages/application/safety-environmental-inspection/archive/detail-check?INSPECTION_ID='+e.INSPECTION_ID + '&id=' + e.HIDDEN_ID
				});
			},
			getQuery(){	//搜索按钮事件
				var _this = this;
				_this.showCount = -1;
				_this.currentPage = 1;
				_this.list = [];
				_this.isEnd = false;
				_this.getData();
			},
			InputBlur(e){
				this.NameLikes = e.detail.value
			},
			// 滑动到底方法
			scrolltolower(){
				var _this = this;
				_this.showCount = -1;
				_this.currentPage = _this.currentPage + 1;
				_this.isEnd = false;
				if(_this.totalPage >= _this.currentPage){
					_this.getData();//开始分页查询
				}
			},

			statusChange(e){
				this.sindex = e.detail.value;
				this.STATUS=this.statusList[this.sindex].id;
				this.getQuery();
			},
			getData(){
				var _this = this;
				if (_this.isEnd) {
					return
				}else{
					this.isEnd =true;
				}
				uni.showLoading({
					title:"加载中..."
				});//加载中动画
				uni.request({
					url: basePath +'/app/hidden/listForSafetyEnvironmental?showCount='+_this.showCount+'&currentPage='+_this.currentPage ,
					method: 'POST',
					dataType: 'json',
					header: {
						'Content-type':'application/x-www-form-urlencoded'
					},
					data: {
						// CORPINFO_ID:corpinfoId,
						INSPECTION_ID:this.INSPECTION_ID,
						INSPECTION_STATUS: '3-7', // 检查状态
						tm:new Date().getTime(),
						KEYWORDS : _this.NameLikes, //关键字模糊查询
					},
					success: (res) => {
						uni.hideLoading();//结束加载中动画
						if (res.data != null) {
							_this.totalPage = res.data.page.totalPage;
							if(_this.list.length == 0){
								_this.list = res.data.varList;
							}else{
								if(res.data.varList != null){
									_this.list2 = res.data.varList;
									_this.list = _this.list.concat(_this.list2);
								}
							}
						}

					}
				})
			},
			translate(id) {
				for (var i = 0; i < this.statusList.length; i++) {
					if (this.statusList[i].id == id) return this.statusList[i].name
				}
			}
		}
	}
</script>

<style>
</style>
