-- =============================================
-- org_personnel 表新增字段 - 技术负责人/过程控制负责人标识
-- 日期: 2026-07-14
-- 执行: mysql -u<user> -p<db> < increment-org-personnel-leader-flags-20260714.sql
-- =============================================

SET NAMES utf8mb4;

ALTER TABLE `org_personnel`
    ADD COLUMN `technical_director_flag` tinyint(1) NOT NULL DEFAULT 0 COMMENT '是否技术负责人(0否1是)' AFTER `proof_material_url`,
    ADD COLUMN `process_control_leader_flag` tinyint(1) NOT NULL DEFAULT 0 COMMENT '是否过程控制负责人(0否1是)' AFTER `technical_director_flag`;
