-- =============================================
-- 2026-07-14 表字段变更增量脚本
-- 执行: mysql -u<user> -p<db> < increment-org-personnel-leader-flags-20260714.sql
-- =============================================

SET NAMES utf8mb4;

-- =============================================
-- org_personnel 表
-- =============================================

-- 1. 新增 技术负责人/过程控制负责人 标识字段
ALTER TABLE `org_personnel`
    ADD COLUMN `technical_director_flag` tinyint(1) NOT NULL DEFAULT 0 COMMENT '是否技术负责人(0否1是)' AFTER `proof_material_url`,
    ADD COLUMN `process_control_leader_flag` tinyint(1) NOT NULL DEFAULT 0 COMMENT '是否过程控制负责人(0否1是)' AFTER `technical_director_flag`;

-- 2. title_name → title_code
ALTER TABLE `org_personnel` CHANGE COLUMN `title_name` `title_code` varchar(50) DEFAULT NULL COMMENT '职称';

-- 3. 新增 基础学科专业id
ALTER TABLE `org_personnel`
    ADD COLUMN `basic_discipline_major_id` bigint DEFAULT NULL COMMENT '基础学科专业id' AFTER `major`;

-- =============================================
-- qual_filing_personnel 表
-- =============================================

-- 4. title_name → title_code
ALTER TABLE `qual_filing_personnel` CHANGE COLUMN `title_name` `title_code` varchar(50) DEFAULT NULL COMMENT '职称';

-- =============================================
-- qual_filing_personnel_change 表
-- =============================================

-- 5. title_name → title_code（如表已存在）
ALTER TABLE `qual_filing_personnel_change` CHANGE COLUMN `title_name` `title_code` varchar(50) DEFAULT NULL COMMENT '职称';

-- =============================================
-- qual_filing 表
-- =============================================

-- 6. 新增 预警状态字段
ALTER TABLE `qual_filing`
    ADD COLUMN `alert_status` varchar(50) DEFAULT NULL COMMENT '预警状态' AFTER `apply_type_name`;

-- =============================================
-- qual_filing_change 表
-- =============================================

-- 7. 新增 预警状态字段
ALTER TABLE `qual_filing_change`
    ADD COLUMN `alert_status` varchar(50) DEFAULT NULL COMMENT '预警状态' AFTER `filing_status_name`;
