-- ============================================================
-- 变更说明：
-- 1. org_personnel: 删除 professional_level_code、professional_level_name、person_type_name；
--    title_code 改为 title_code_arr，类型 text
-- 2. qual_filing_personnel: 删除 person_type_name；
--    title_code 改为 title_code_arr，类型 text
-- 3. qual_filing_personnel_change: 删除 person_type_name；
--    title_code 改为 title_code_arr，类型 text
-- ============================================================

-- ----------------------------
-- org_personnel
-- ----------------------------
ALTER TABLE `org_personnel`
    DROP COLUMN `professional_level_code`,
    DROP COLUMN `professional_level_name`,
    DROP COLUMN `person_type_name`,
    CHANGE COLUMN `title_code` `title_code_arr` text CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL COMMENT '职称(多个逗号分隔)';

-- ----------------------------
-- qual_filing_personnel
-- ----------------------------
ALTER TABLE `qual_filing_personnel`
    DROP COLUMN `person_type_name`,
    CHANGE COLUMN `title_code` `title_code_arr` text CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL COMMENT '职称(多个逗号分隔)';

-- ----------------------------
-- qual_filing_personnel_change
-- ----------------------------
ALTER TABLE `qual_filing_personnel_change`
    DROP COLUMN `person_type_name`,
    CHANGE COLUMN `title_code` `title_code_arr` text CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL COMMENT '职称(多个逗号分隔)';


INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (142, 'COAL_MINING,METAL_NONMETAL_MINING,ONSHORE_OIL_GAS', 'MECHANICAL', NULL, '矿业机械', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (172, 'ONSHORE_OIL_GAS', 'OIL_PRODUCTION', NULL, '钻井工程', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (173, 'ONSHORE_OIL_GAS', 'OIL_PRODUCTION', NULL, '采油工程', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (174, 'ONSHORE_OIL_GAS', 'OIL_PRODUCTION', NULL, '油藏工程', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (175, 'ONSHORE_OIL_GAS', 'OIL_PRODUCTION', NULL, '石油工程', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (176, 'ONSHORE_OIL_GAS', 'OIL_PRODUCTION', NULL, '石油钻井', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (180, 'ONSHORE_OIL_GAS,ONSHORE_OIL_GAS_PIPELINE', 'OIL_GAS_STORAGE_TRANSPORT,STORAGE_AND_TRANSPORT', NULL, '石油储运', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (181, 'ONSHORE_OIL_GAS,ONSHORE_OIL_GAS_PIPELINE', 'OIL_GAS_STORAGE_TRANSPORT,STORAGE_AND_TRANSPORT', NULL, '石油天然气储运工程', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (182, 'ONSHORE_OIL_GAS,ONSHORE_OIL_GAS_PIPELINE', 'OIL_GAS_STORAGE_TRANSPORT,STORAGE_AND_TRANSPORT', NULL, '油气储运工程', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (183, 'ONSHORE_OIL_GAS_PIPELINE', 'OIL_GAS_STORAGE_TRANSPORT', NULL, '线路工程', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (184, 'ONSHORE_OIL_GAS_PIPELINE', 'OIL_GAS_STORAGE_TRANSPORT', NULL, '储运工艺', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (185, 'ONSHORE_OIL_GAS_PIPELINE', 'OIL_GAS_STORAGE_TRANSPORT', NULL, '设备与控制', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (192, 'ONSHORE_OIL_GAS_PIPELINE', 'AUTOMATION_INSTRUMENT', NULL, '自动化仪表和设备', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (193, 'ONSHORE_OIL_GAS_PIPELINE', 'AUTOMATION_INSTRUMENT', NULL, '智能监控系统', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (195, 'ONSHORE_OIL_GAS_PIPELINE', 'ELECTRICAL', NULL, '继电保护与自动远动技术', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (211, 'ONSHORE_OIL_GAS_PIPELINE', 'ANTICORROSION', NULL, '腐蚀与防护', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (230, 'ONSHORE_OIL_GAS,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'CHEMICAL_MECHANICAL,MECHANICAL', NULL, '高分子材料加工机械', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (232, 'ONSHORE_OIL_GAS,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'CHEMICAL_MECHANICAL,MECHANICAL', NULL, '化工设备与机械', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (234, 'ONSHORE_OIL_GAS,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'CHEMICAL_MECHANICAL,MECHANICAL', NULL, '化工机械', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (245, 'ONSHORE_OIL_GAS,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'ELECTRICAL', NULL, '电力系统及其自动化', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (258, 'ONSHORE_OIL_GAS_PIPELINE,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'AUTOMATION,AUTOMATION_INSTRUMENT', NULL, '计算机及应用', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (259, 'COAL_MINING,METAL_NONMETAL_MINING,ONSHORE_OIL_GAS_PIPELINE,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'AUTOMATION,AUTOMATION_INSTRUMENT,ELECTRICAL,PROCESS_EQUIPMENT_CONTROL', NULL, '自动控制', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (291, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,ONSHORE_OIL_GAS,ONSHORE_OIL_GAS_PIPELINE,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'ELECTRICAL', NULL, '高压电技术及设备', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (292, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,ONSHORE_OIL_GAS,ONSHORE_OIL_GAS_PIPELINE,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'ELECTRICAL', NULL, '电气绝缘与电缆', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (296, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,ONSHORE_OIL_GAS,ONSHORE_OIL_GAS_PIPELINE,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'ELECTRICAL', NULL, '高电压与绝缘技术', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (310, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS,ONSHORE_OIL_GAS_PIPELINE,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'SAFETY,VENTILATION', NULL, '安全工程', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (311, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS', 'MECHANICAL', NULL, '机械制造工艺与设备', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (312, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS', 'MECHANICAL', NULL, '机械制造工程', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (313, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS', 'MECHANICAL', NULL, '机械设计及制造', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (318, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'CHEMICAL_MECHANICAL,MECHANICAL', NULL, '设备工程与管理', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (319, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS', 'MECHANICAL', NULL, '机械设计制造及其自动化', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (321, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS', 'MECHANICAL', NULL, '机械工程', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (322, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS', 'MECHANICAL', NULL, '机械电子工程', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (323, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS', 'MECHANICAL', NULL, '工业设计', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (324, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'CHEMICAL_MECHANICAL,MECHANICAL', NULL, '过程装备与控制工程', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (325, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS', 'MECHANICAL', NULL, '机械工程及自动化', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (326, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS', 'MECHANICAL', NULL, '工程机械', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (327, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS', 'MECHANICAL', NULL, '制造自动化与测控技术', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (328, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS', 'MECHANICAL', NULL, '制造工程', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (329, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS,ONSHORE_OIL_GAS_PIPELINE,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'ELECTRICAL', NULL, '电气技术', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (330, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'ELECTRICAL', NULL, '电机', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (331, 'FIREWORKS_FIRECRACKERS,METAL_SMELTING,ONSHORE_OIL_GAS,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'ELECTRICAL', NULL, '电器', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (332, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'ELECTRICAL', NULL, '电机电器及其控制', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (333, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS,ONSHORE_OIL_GAS_PIPELINE,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'AUTOMATION,AUTOMATION_INSTRUMENT,ELECTRICAL', NULL, '工业自动化', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (334, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS,ONSHORE_OIL_GAS_PIPELINE,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'AUTOMATION,ELECTRICAL', NULL, '工业电气自动化', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (336, 'FIREWORKS_FIRECRACKERS,METAL_SMELTING,ONSHORE_OIL_GAS,ONSHORE_OIL_GAS_PIPELINE,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'AUTOMATION,AUTOMATION_INSTRUMENT,ELECTRICAL', NULL, '生产过程自动化', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (337, 'FIREWORKS_FIRECRACKERS,METAL_SMELTING,ONSHORE_OIL_GAS,ONSHORE_OIL_GAS_PIPELINE,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'ELECTRICAL', NULL, '电力牵引与传动控制', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (338, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS,ONSHORE_OIL_GAS_PIPELINE', 'ELECTRICAL', NULL, '电气工程及其自动化', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (339, 'FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS,ONSHORE_OIL_GAS_PIPELINE,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'AUTOMATION,AUTOMATION_INSTRUMENT,ELECTRICAL', NULL, '自动化', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (340, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS,ONSHORE_OIL_GAS_PIPELINE,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'ELECTRICAL', NULL, '电气工程与自动化', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (341, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS,ONSHORE_OIL_GAS_PIPELINE,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'ELECTRICAL', NULL, '电气信息工程', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (342, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS,ONSHORE_OIL_GAS_PIPELINE,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'ELECTRICAL', NULL, '电力工程与管理', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (343, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS,ONSHORE_OIL_GAS_PIPELINE,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'ELECTRICAL', NULL, '电气技术教育', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (344, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS,ONSHORE_OIL_GAS_PIPELINE,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'ELECTRICAL', NULL, '电机电器智能化', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');
INSERT INTO `safety-eval-service`.`basic_discipline_major` (`id`, `industry_code`, `professional_capability_code`, `professional_code`, `professional_name`, `delete_enum`, `remarks`, `create_name`, `update_name`, `tenant_id`, `org_id`, `version`, `create_time`, `update_time`, `create_id`, `update_id`, `env`) VALUES (345, 'COAL_MINING,FIREWORKS_FIRECRACKERS,METAL_NONMETAL_MINING,METAL_SMELTING,ONSHORE_OIL_GAS,ONSHORE_OIL_GAS_PIPELINE,PETROCHEMICAL_CHEMICAL_PHARMACEUTICAL', 'ELECTRICAL', NULL, '电气工程与智能控制', 'false', NULL, NULL, NULL, NULL, NULL, 0, '2026-07-14 11:41:48', '2026-07-14 11:41:48', NULL, NULL, 'prod');